Notes on {Medley}<internal>test>

<test> subdirs:

admin, ARs, env, GC, IO , LANGUAGE, Library, loops, lyric, Maiko, tools <test>Top level files README.TEDIT (this file)

TEST-RESULTS (contains log from running AUTO tests from 1988) DOT.read-me-first (originally .read-me-first)

<test>4045> Deleted

<test>Maiko> Subdir ARs, AUTO, Aux, HAND, OBSOLETE Top level files

STACKHAX (has CHECKSTACKSPACE, seems to get tangled up in it’s own stack STACKTAKESHI (seems to cause a stack overflow on opurpose, which leaves stack clean enough that URAID hard-reset recovers from. Suspect timeouts aren’t correct BAD-XREF (no compiled file) display.cl (says "from Texas Instruments")

<test>Maiko>ARs>

looks like junk: optests & .dfasl (like AUTO>OPCODES.TEST) ENDLESSPUSHES AR-TEST-CASES.Auto-log

<test>Maiko>AUTO> OPCODES.TEST OPCODES.DFASL

may need EXPORTS.ALL to compile most tests succeed test BITBLT-DIAGONALS and BITBLT-SLOPED-LINES fail A little hard to debug because the inspector for 2D arrays fail

<test>Maiko>Aux> Another cop y of bbtests and optests.lisp

<test>Maiko>HAND> MAIKO-ARRAY-TESTS and DFASL looks like in AUTO

2

<test>Maiko>OBSOLETE> Probably incororated into AUTO> AREF-TESTER ARRAY-TESTER.TEST FLOAT-TESTER MAIKO-UNWIND-TESTS TESTER (compiled OK) unwindtest xclopcodetests

<test>Library> 4045xlpstream> junk Auto> junk(!)

<test>loops> LOOPS-SETUP.TEDIT LOOPS-TESTER-.... files

test>Lyric> (old-versions of DO-TEST .dfasl and .tedit)

<test>Tools>

AUTOTEST.TEDIT (originql AUTOTEST.TEDIT-orig) AUTOTEST & .DFASL framework for running tests

DO-TEST & .DFASL (copied newer version from Medley internal/library) DO-TEST.TEDIT on Writing Software Tests (many other files not reviewed yet)